-- phpMyAdmin SQL Dump
-- version 5.2.1
-- https://www.phpmyadmin.net/
--
-- Хост: mariadb
-- Время создания: Июн 04 2024 г., 21:25
-- Версия сервера: 10.11.4-MariaDB-1:10.11.4+maria~ubu2204-log
-- Версия PHP: 8.2.8

SET SQL_MODE = "NO_AUTO_VALUE_ON_ZERO";
START TRANSACTION;
SET time_zone = "+00:00";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8mb4 */;

--
-- База данных: `tf2.facti13`
--

-- --------------------------------------------------------

--
-- Структура таблицы `steam2vk`
--

CREATE TABLE `steam2vk` (
  `steam_id` varchar(32) CHARACTER SET utf8mb3 COLLATE utf8mb3_unicode_ci NOT NULL,
  `vk_id` int(11) NOT NULL,
  `steam_url` varchar(1024) CHARACTER SET utf8mb3 COLLATE utf8mb3_unicode_ci NOT NULL
) ENGINE=MyISAM DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci;

--
-- Дамп данных таблицы `steam2vk`
--

INSERT INTO `steam2vk` (`steam_id`, `vk_id`, `steam_url`) VALUES
('XXXXXXXXXXXXXX', 228, 'https://steamcommunity.com/id/gabe');
COMMIT;

/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
